ALTER TABLE vehicle_open_hydrogen_stream_state
    ADD COLUMN cycle_min_mass_kg DECIMAL(18,3) NULL AFTER last_mass_kg;

UPDATE vehicle_open_hydrogen_stream_state
SET cycle_min_mass_kg=last_mass_kg
WHERE cycle_min_mass_kg IS NULL;
